/* global React */
const { useState, useEffect, useRef, useContext, createContext, useMemo } = React;

/* ------------------------------------------------------------------
   i18n — PL/EN content
   ------------------------------------------------------------------ */
const COPY = {
  pl: {
    nav: { products: "Produkty", science: "Nauka", compare: "Porównaj", faq: "FAQ", buy: "Kup teraz" },
    hero: {
      eyebrow: "FDA Cleared · Class II Medical Device",
      sceneA: { k: "Światło.", v: "630 i 850 nanometrów." },
      sceneB: { k: "Przenika skórę.", v: "Do 5 cm w głąb tkanki." },
      sceneC: { k: "Regeneruje.", v: "Ból ustępuje. Tkanki odnawiają się." },
      cta: "Zobacz produkty",
      ghost: "Obejrzyj 30 s demo",
      scroll: "PRZEWIŃ",
    },
    wavelengths: {
      eyebrow: "Dwie długości fali",
      title: "Czerwone światło.\nPodczerwień.",
      subtitle: "Dwa spektra pracujące razem. Jedno działa na powierzchni, drugie sięga głębiej niż jakikolwiek krem.",
      redTitle: "630 nm — Czerwone",
      redDesc: "Wnika w naskórek i górne warstwy skóry właściwej. Stymuluje produkcję kolagenu, wygładza, redukuje stany zapalne.",
      irTitle: "850 nm — Podczerwone",
      irDesc: "Sięga do mięśni, stawów i głębokich tkanek. Łagodzi ból, przyspiesza regenerację, wspomaga naprawę komórek.",
      scrubLabel: "Głębokość wnikania",
      layers: ["Naskórek", "Skóra właściwa", "Tkanka podskórna", "Mięśnie", "Stawy"],
    },
    howItWorks: {
      eyebrow: "10 minut dziennie",
      title: "Jedna sesja. Cały dzień regeneracji.",
      subtitle: "Zegar startuje. 10 minut później skończone. Bez kremów, bez tabletek.",
      steps: [
        { n: "01", t: "Załóż panel", d: "Elastyczny. Dopasuje się do pleców, kolana, ramienia, karku." },
        { n: "02", t: "Włącz sesję", d: "Jedno dotknięcie. Diody zapalają się falą. Timer odlicza." },
        { n: "03", t: "Odpoczywaj", d: "Siedzisz, trenujesz, bierzesz prysznic. Światło pracuje." },
      ],
      timerLabel: "Sesja",
    },
    products: {
      eyebrow: "Trzy modele",
      title: "Wybierz swój panel.",
      subtitle: "Od podstawowego do klinicznego. Ten sam rozmiar. Inna moc.",
      cta: "Poznaj",
      priceFrom: "od",
      items: [
        {
          slug: "essential", name: "Essential", tag: "Bestseller",
          price: "1 449 zł", priceSub: "$399",
          desc: "Dwie długości fali. Jedna prosta sesja. Wszystko czego potrzebujesz.",
          specs: "2 fale · 45 diod · 10 min · Sweatproof",
          image: "images/lumaflex/essential-main.webp",
        },
        {
          slug: "essential-pro", name: "Essential Pro", tag: "Pełne spektrum",
          price: "2 175 zł", priceSub: "$599",
          desc: "Sześć długości fali. Precyzja kliniczna. Dostęp do Lumaflex Academy.",
          specs: "6 fal · 45 diod · 10 min · Sweatproof",
          image: "images/lumaflex/essential-pro-main.png",
        },
        {
          slug: "body-pro-kit", name: "Body Pro Kit", tag: "Flagowy",
          price: "2 501 zł", priceSub: "$689",
          desc: "Smart Pulse. Dwa power banki. Twarde etui. Wodoodporny IP67.",
          specs: "6 fal · Smart Pulse · 10 min · IP67",
          image: "images/lumaflex/body-pro-main.webp",
        },
      ],
    },
    waterproof: {
      eyebrow: "IP67 · Body Pro Kit",
      title: "Działa mokre.\nDziała pod wodą.",
      subtitle: "Do prysznica. Do sauny. Do wanny z zimną wodą po treningu. Panel nie przestaje świecić, kiedy temperatura spada.",
      toggleDry: "Na sucho",
      toggleWet: "Pod wodą",
      spec: "Zanurzenie do 1 metra, przez 30 minut. Test IP67, certyfikat IEC 60529.",
    },
    certs: {
      eyebrow: "Nauka za światłem",
      title: "Technologia NASA. Standard medyczny.",
      subtitle: "Terapia czerwonym światłem była rozwijana w NASA do leczenia ran astronautów. Dziś jest zatwierdzona przez FDA jako urządzenie medyczne klasy II.",
      items: [
        { k: "FDA Cleared", v: "Class II Medical Device" },
        { k: "CE", v: "Europejska zgodność" },
        { k: "Health Canada", v: "Kanadyjski certyfikat" },
        { k: "NMPA", v: "Chińska administracja medyczna" },
      ],
      nasaNote: "Wavelengths 630–1064 nm · 45 dual-chip LED · Testy kliniczne"
    },
    compare: {
      eyebrow: "Porównanie",
      title: "Który model?",
      subtitle: "Te same wymiary. Inne możliwości.",
      headers: ["", "Essential", "Essential Pro", "Body Pro Kit"],
      rows: [
        { l: "Długości fali", v: ["2 (630 + 850 nm)", "6 (630–1064 nm)", "6 (630–1064 nm)"] },
        { l: "Sesja", v: ["10 min", "10 min", "10 min"] },
        { l: "Waga", v: ["1.06 kg", "1.06 kg", "1.06 kg"] },
        { l: "Wodoodporność", v: ["Sweatproof", "Sweatproof", "IP67"] },
        { l: "Smart Pulse App", v: ["—", "—", "✓"] },
        { l: "Lumaflex Academy", v: ["—", "Dożywotnio", "—"] },
        { l: "Power Bank", v: ["1×", "1×", "2× (wymienny)"] },
        { l: "Etui", v: ["Torba", "Torba", "Hard Shell"] },
        { l: "Cena", v: ["1 449 zł", "2 175 zł", "2 501 zł"] },
      ],
    },
    faq: {
      eyebrow: "Pytania",
      title: "Zanim kupisz.",
      items: [
        { q: "Czym właściwie jest terapia czerwonym światłem?",
          a: "Fotobiomodulacja. Światło o długości 630–1064 nm jest absorbowane przez mitochondria komórek. Mitochondria produkują więcej ATP — paliwa komórkowego. Skutek: szybsza regeneracja, mniej stanów zapalnych, lepsza produkcja kolagenu." },
        { q: "Czy to jest bezpieczne?",
          a: "Tak. Panele Lumaflex mają certyfikat FDA Cleared Class II (USA) oraz CE (UE), Health Canada, NMPA (Chiny). Przeszły testy bezpieczeństwa i skuteczności. Nie uszkadzają skóry, nie powodują oparzeń." },
        { q: "Kto NIE powinien używać panelu?",
          a: "Konsultacja z lekarzem jest wymagana jeśli: jesteś w ciąży, masz aktywną chorobę nowotworową, epilepsję światłoczułą, chorobę autoimmunologiczną skóry (toczeń, porfiria), świeżo wytatuowaną skórę, lub przyjmujesz leki światłouczulające (niektóre antybiotyki, retinoidy, ziele dziurawca). Urządzenie nie zastępuje diagnostyki ani leczenia medycznego." },
        { q: "Ile trwa sesja?",
          a: "10 minut. Panel ma wbudowany timer, który automatycznie wyłącza diody. Zalecamy 1–2 sesje dziennie w zależności od celu." },
        { q: "Jak szybko widać efekty?",
          a: "Pierwsze efekty przeciwbólowe po 2–3 sesjach. Regeneracja tkanek i efekty kosmetyczne po 4–6 tygodniach regularnego stosowania. Efekty indywidualne — zależą od stanu wyjściowego i regularności." },
        { q: "Na czym polega różnica między modelami?",
          a: "Essential: 2 długości fali, podstawa. Essential Pro: 6 długości fali, pełne spektrum, dostęp do Lumaflex Academy. Body Pro Kit: 6 fal + sterowanie impulsami przez aplikację + IP67 + dwa power banki." },
        { q: "Gwarancja, zwrot, wysyłka?",
          a: "30 dni na zwrot bez podania przyczyny. 2 lata gwarancji producenta. Darmowa wysyłka PL + DACH. Płatności: Stripe (karta, Apple Pay, Google Pay, przelewy24, Klarna)." },
      ],
    },
    footer: {
      tag: "Terapia światłem nowej generacji. Oficjalny partner PL/DACH.",
      products: { t: "Produkty", i: ["Essential", "Essential Pro", "Body Pro Kit", "Akcesoria"] },
      company: { t: "Firma", i: ["O nas", "Nauka", "Partner", "Kontakt"] },
      support: { t: "Wsparcie", i: ["FAQ", "Wysyłka", "Zwroty", "Gwarancja"] },
      certs: "FDA Cleared · CE · Health Canada · NMPA",
      legal: "© 2026 Muszyński Online · Oficjalny partner Lumaflex PL/DACH",
      privacy: "Prywatność",
      terms: "Regulamin",
      impressum: "Impressum",
    },
  },
  en: {
    nav: { products: "Products", science: "Science", compare: "Compare", faq: "FAQ", buy: "Buy" },
    hero: {
      eyebrow: "FDA Cleared · Class II Medical Device",
      sceneA: { k: "Light.", v: "630 and 850 nanometers." },
      sceneB: { k: "Absorbed by skin.", v: "Up to 5 cm into tissue." },
      sceneC: { k: "Regenerates.", v: "Pain fades. Tissue repairs." },
      cta: "See the panels",
      ghost: "Watch 30s demo",
      scroll: "SCROLL",
    },
    wavelengths: {
      eyebrow: "Two wavelengths",
      title: "Red light.\nInfrared.",
      subtitle: "Two spectra working together. One works on the surface. The other goes deeper than any cream.",
      redTitle: "630 nm — Red",
      redDesc: "Absorbed by the epidermis and upper dermis. Stimulates collagen, smooths, reduces inflammation.",
      irTitle: "850 nm — Infrared",
      irDesc: "Reaches muscle, joint and deep tissue. Relieves pain, accelerates recovery, supports cell repair.",
      scrubLabel: "Penetration depth",
      layers: ["Epidermis", "Dermis", "Subcutis", "Muscle", "Joint"],
    },
    howItWorks: {
      eyebrow: "10 minutes daily",
      title: "One session. A day of recovery.",
      subtitle: "The timer starts. Ten minutes later it's over. No creams. No pills.",
      steps: [
        { n: "01", t: "Put on the panel", d: "Flexible. Wraps around your back, knee, shoulder, neck." },
        { n: "02", t: "Start a session", d: "One tap. LEDs light up in a wave. The timer counts down." },
        { n: "03", t: "Rest", d: "Sit, train, take a shower. The light does the work." },
      ],
      timerLabel: "Session",
    },
    products: {
      eyebrow: "Three models",
      title: "Choose your panel.",
      subtitle: "From entry to clinical. Same form factor. Different power.",
      cta: "Details",
      priceFrom: "from",
      items: [
        { slug: "essential", name: "Essential", tag: "Bestseller",
          price: "$399", priceSub: "1 449 zł",
          desc: "Two wavelengths. One simple session. Everything you need.",
          specs: "2 waves · 45 LEDs · 10 min · Sweatproof",
          image: "images/lumaflex/essential-main.webp" },
        { slug: "essential-pro", name: "Essential Pro", tag: "Full spectrum",
          price: "$599", priceSub: "2 175 zł",
          desc: "Six wavelengths. Clinical precision. Lumaflex Academy included.",
          specs: "6 waves · 45 LEDs · 10 min · Sweatproof",
          image: "images/lumaflex/essential-pro-main.png" },
        { slug: "body-pro-kit", name: "Body Pro Kit", tag: "Flagship",
          price: "$689", priceSub: "2 501 zł",
          desc: "Smart Pulse. Two power banks. Hard case. IP67 waterproof.",
          specs: "6 waves · Smart Pulse · 10 min · IP67",
          image: "images/lumaflex/body-pro-main.webp" },
      ],
    },
    waterproof: {
      eyebrow: "IP67 · Body Pro Kit",
      title: "Works wet.\nWorks underwater.",
      subtitle: "In the shower. In the sauna. In an ice bath after a session. The panel doesn't stop glowing when the temperature drops.",
      toggleDry: "Dry", toggleWet: "Underwater",
      spec: "Submersion up to 1 m for 30 minutes. IP67 tested, IEC 60529 certified.",
    },
    certs: {
      eyebrow: "The science",
      title: "NASA-born. Medical-grade.",
      subtitle: "Red light therapy was developed at NASA to heal astronaut wounds. Today it is FDA cleared as a Class II medical device.",
      items: [
        { k: "FDA Cleared", v: "Class II Medical Device" },
        { k: "CE", v: "European conformity" },
        { k: "Health Canada", v: "Canadian clearance" },
        { k: "NMPA", v: "China medical authority" },
      ],
      nasaNote: "Wavelengths 630–1064 nm · 45 dual-chip LEDs · Clinical trials"
    },
    compare: {
      eyebrow: "Compare", title: "Which model?", subtitle: "Same size. Different capability.",
      headers: ["", "Essential", "Essential Pro", "Body Pro Kit"],
      rows: [
        { l: "Wavelengths", v: ["2 (630 + 850 nm)", "6 (630–1064 nm)", "6 (630–1064 nm)"] },
        { l: "Session", v: ["10 min", "10 min", "10 min"] },
        { l: "Weight", v: ["1.06 kg", "1.06 kg", "1.06 kg"] },
        { l: "Waterproof", v: ["Sweatproof", "Sweatproof", "IP67"] },
        { l: "Smart Pulse App", v: ["—", "—", "✓"] },
        { l: "Lumaflex Academy", v: ["—", "Lifetime", "—"] },
        { l: "Power Bank", v: ["1×", "1×", "2× (swappable)"] },
        { l: "Case", v: ["Soft bag", "Soft bag", "Hard Shell"] },
        { l: "Price", v: ["$399", "$599", "$689"] },
      ],
    },
    faq: {
      eyebrow: "Questions", title: "Before you buy.",
      items: [
        { q: "What is red light therapy, really?",
          a: "Photobiomodulation. Light at 630–1064 nm is absorbed by cell mitochondria. The mitochondria produce more ATP — cellular fuel. The result: faster recovery, less inflammation, better collagen production." },
        { q: "Is it safe?",
          a: "Yes. Lumaflex panels are FDA Cleared Class II (USA) and CE (EU), Health Canada, NMPA (China). Tested for safety and efficacy. No skin damage, no burns." },
        { q: "Who should NOT use the panel?",
          a: "Consult a doctor if: pregnant, active cancer, photosensitive epilepsy, autoimmune skin conditions (lupus, porphyria), fresh tattoos, or taking photosensitizing medication (certain antibiotics, retinoids, St. John's wort). This device does not replace medical diagnosis or treatment." },
        { q: "How long is a session?",
          a: "10 minutes. The panel has a built-in timer that automatically ends the session. We recommend 1–2 sessions per day depending on your goal." },
        { q: "How quickly will I see results?",
          a: "Pain-relief effects after 2–3 sessions. Tissue regeneration and cosmetic effects after 4–6 weeks of regular use. Individual results vary." },
        { q: "What's the difference between models?",
          a: "Essential: 2 wavelengths, the foundation. Essential Pro: 6 wavelengths, full spectrum, plus Lumaflex Academy. Body Pro Kit: 6 waves + app-controlled pulsing + IP67 + two power banks." },
        { q: "Warranty, returns, shipping?",
          a: "30-day no-questions return. 2-year manufacturer warranty. Free PL + DACH shipping. Payments via Stripe (card, Apple Pay, Google Pay, Klarna)." },
      ],
    },
    footer: {
      tag: "Next-generation light therapy. Official PL/DACH partner.",
      products: { t: "Products", i: ["Essential", "Essential Pro", "Body Pro Kit", "Accessories"] },
      company: { t: "Company", i: ["About", "Science", "Partner", "Contact"] },
      support: { t: "Support", i: ["FAQ", "Shipping", "Returns", "Warranty"] },
      certs: "FDA Cleared · CE · Health Canada · NMPA",
      legal: "© 2026 Muszyński Online · Official Lumaflex partner for PL/DACH",
      privacy: "Privacy",
      terms: "Terms",
      impressum: "Impressum",
    },
  },
  de: {
    nav: { products: "Produkte", science: "Wissenschaft", compare: "Vergleich", faq: "FAQ", buy: "Jetzt kaufen" },
    hero: {
      eyebrow: "FDA Cleared · CE · Medizinprodukt Klasse II",
      sceneA: { k: "Licht.", v: "630 und 850 Nanometer." },
      sceneB: { k: "Dringt ein.", v: "Bis zu 5 cm Gewebetiefe." },
      sceneC: { k: "Regeneriert.", v: "Schmerz lässt nach. Gewebe heilt." },
      cta: "Panels ansehen",
      ghost: "30-Sek-Demo",
      scroll: "SCROLLEN",
    },
    wavelengths: {
      eyebrow: "Zwei Wellenlängen",
      title: "Rotlicht.\nInfrarot.",
      subtitle: "Zwei Spektren, die zusammenarbeiten. Eines wirkt an der Oberfläche. Das andere reicht tiefer als jede Creme.",
      redTitle: "630 nm — Rotlicht",
      redDesc: "Dringt in Epidermis und obere Dermis ein. Regt Kollagenproduktion an, glättet, reduziert Entzündungen.",
      irTitle: "850 nm — Infrarot",
      irDesc: "Erreicht Muskeln, Gelenke und tiefes Gewebe. Lindert Schmerzen, beschleunigt Regeneration, unterstützt Zellreparatur.",
      scrubLabel: "Eindringtiefe",
      layers: ["Epidermis", "Dermis", "Unterhaut", "Muskel", "Gelenk"],
    },
    howItWorks: {
      eyebrow: "10 Minuten täglich",
      title: "Eine Sitzung. Ein Tag Regeneration.",
      subtitle: "Timer startet. Zehn Minuten später ist es vorbei. Keine Cremes. Keine Pillen.",
      steps: [
        { n: "01", t: "Panel anlegen", d: "Flexibel. Passt sich Rücken, Knie, Schulter, Nacken an." },
        { n: "02", t: "Sitzung starten", d: "Ein Tippen. LEDs leuchten wellenförmig. Timer läuft rückwärts." },
        { n: "03", t: "Ausruhen", d: "Sitzen, trainieren, duschen. Das Licht macht die Arbeit." },
      ],
      timerLabel: "Sitzung",
    },
    products: {
      eyebrow: "Drei Modelle",
      title: "Wähle dein Panel.",
      subtitle: "Vom Einstieg bis zur Klinik. Gleiche Form. Unterschiedliche Leistung.",
      cta: "Details",
      priceFrom: "ab",
      items: [
        { slug: "essential", name: "Essential", tag: "Bestseller",
          price: "399 €", priceSub: "$399",
          desc: "Zwei Wellenlängen. Eine einfache Sitzung. Alles, was du brauchst.",
          specs: "2 Wellen · 45 LEDs · 10 Min · Schweißfest",
          image: "images/lumaflex/essential-main.webp" },
        { slug: "essential-pro", name: "Essential Pro", tag: "Vollspektrum",
          price: "599 €", priceSub: "$599",
          desc: "Sechs Wellenlängen. Klinische Präzision. Lumaflex Academy inklusive.",
          specs: "6 Wellen · 45 LEDs · 10 Min · Schweißfest",
          image: "images/lumaflex/essential-pro-main.png" },
        { slug: "body-pro-kit", name: "Body Pro Kit", tag: "Flaggschiff",
          price: "689 €", priceSub: "$689",
          desc: "Smart Pulse. Zwei Powerbanks. Hartschalenkoffer. IP67 wasserdicht.",
          specs: "6 Wellen · Smart Pulse · 10 Min · IP67",
          image: "images/lumaflex/body-pro-main.webp" },
      ],
    },
    waterproof: {
      eyebrow: "IP67 · Body Pro Kit",
      title: "Funktioniert nass.\nFunktioniert unter Wasser.",
      subtitle: "Unter der Dusche. In der Sauna. Im Eisbad nach dem Training. Das Panel leuchtet weiter, wenn die Temperatur fällt.",
      toggleDry: "Trocken", toggleWet: "Unter Wasser",
      spec: "Tauchtiefe bis 1 m für 30 Minuten. IP67 getestet, nach IEC 60529 zertifiziert.",
    },
    certs: {
      eyebrow: "Die Wissenschaft",
      title: "NASA-Ursprung. Medizinstandard.",
      subtitle: "Rotlichttherapie wurde von der NASA zur Heilung von Wunden bei Astronauten entwickelt. Heute ist sie als Medizinprodukt Klasse II FDA-zugelassen und CE-konform.",
      items: [
        { k: "FDA Cleared", v: "Klasse II Medizinprodukt" },
        { k: "CE", v: "Europäische Konformität" },
        { k: "Health Canada", v: "Kanadische Zulassung" },
        { k: "NMPA", v: "Chinesische Medizinbehörde" },
      ],
      nasaNote: "Wellenlängen 630–1064 nm · 45 Dual-Chip LEDs · Klinische Studien"
    },
    compare: {
      eyebrow: "Vergleich", title: "Welches Modell?", subtitle: "Gleiche Größe. Andere Leistung.",
      headers: ["", "Essential", "Essential Pro", "Body Pro Kit"],
      rows: [
        { l: "Wellenlängen", v: ["2 (630 + 850 nm)", "6 (630–1064 nm)", "6 (630–1064 nm)"] },
        { l: "Sitzung", v: ["10 Min", "10 Min", "10 Min"] },
        { l: "Gewicht", v: ["1,06 kg", "1,06 kg", "1,06 kg"] },
        { l: "Wasserfestigkeit", v: ["Schweißfest", "Schweißfest", "IP67"] },
        { l: "Smart Pulse App", v: ["—", "—", "✓"] },
        { l: "Lumaflex Academy", v: ["—", "Lebenslang", "—"] },
        { l: "Powerbank", v: ["1×", "1×", "2× (wechselbar)"] },
        { l: "Koffer", v: ["Softbag", "Softbag", "Hartschale"] },
        { l: "Preis", v: ["399 €", "599 €", "689 €"] },
      ],
    },
    faq: {
      eyebrow: "Fragen", title: "Bevor du kaufst.",
      items: [
        { q: "Was ist Rotlichttherapie eigentlich?",
          a: "Photobiomodulation. Licht bei 630–1064 nm wird von den Mitochondrien der Zellen absorbiert. Die Mitochondrien produzieren mehr ATP — zellulären Treibstoff. Ergebnis: schnellere Regeneration, weniger Entzündungen, bessere Kollagenproduktion." },
        { q: "Ist es sicher?",
          a: "Ja. Lumaflex Panels sind FDA Cleared Klasse II (USA) sowie CE (EU), Health Canada, NMPA (China). Getestet auf Sicherheit und Wirksamkeit. Keine Hautschäden, keine Verbrennungen." },
        { q: "Wer sollte das Panel NICHT verwenden?",
          a: "Bitte einen Arzt konsultieren bei: Schwangerschaft, aktiver Krebserkrankung, photosensitiver Epilepsie, autoimmunen Hauterkrankungen (Lupus, Porphyrie), frischen Tätowierungen, oder bei Einnahme photosensitivierender Medikamente (bestimmte Antibiotika, Retinoide, Johanniskraut). Dieses Gerät ersetzt keine medizinische Diagnose oder Behandlung." },
        { q: "Wie lange dauert eine Sitzung?",
          a: "10 Minuten. Das Panel hat einen eingebauten Timer, der die Sitzung automatisch beendet. Empfohlen: 1–2 Sitzungen täglich, je nach Ziel." },
        { q: "Wie schnell sehe ich Ergebnisse?",
          a: "Schmerzlinderung nach 2–3 Sitzungen. Geweberegeneration und kosmetische Effekte nach 4–6 Wochen regelmäßiger Anwendung. Individuelle Ergebnisse variieren." },
        { q: "Was unterscheidet die Modelle?",
          a: "Essential: 2 Wellenlängen, die Basis. Essential Pro: 6 Wellenlängen, Vollspektrum, Lumaflex Academy inklusive. Body Pro Kit: 6 Wellen + App-gesteuerte Pulsierung + IP67 + zwei Powerbanks." },
        { q: "Garantie, Rückgabe, Versand?",
          a: "30-Tage-Rückgaberecht ohne Angabe von Gründen. 2 Jahre Herstellergarantie. Kostenloser Versand PL + DACH. Zahlung über Stripe (Karte, Apple Pay, Google Pay, Klarna, SOFORT)." },
      ],
    },
    footer: {
      tag: "Lichttherapie der neuen Generation. Offizieller PL/DACH-Partner.",
      products: { t: "Produkte", i: ["Essential", "Essential Pro", "Body Pro Kit", "Zubehör"] },
      company: { t: "Unternehmen", i: ["Über uns", "Wissenschaft", "Partner", "Kontakt"] },
      support: { t: "Support", i: ["FAQ", "Versand", "Rückgabe", "Garantie"] },
      certs: "FDA Cleared · CE · Health Canada · NMPA",
      legal: "© 2026 Muszyński Online · Offizieller Lumaflex-Partner für PL/DACH",
      privacy: "Datenschutz",
      terms: "AGB",
      impressum: "Impressum",
    },
  },
};

/* ------------------------------------------------------------------
   App-wide context (locale, tweaks)
   ------------------------------------------------------------------ */
const AppCtx = createContext(null);
const useApp = () => useContext(AppCtx);

/* Reveal-on-scroll hook — adds is-pending immediately, removes on intersection */
function useReveal() {
  const ref = useRef(null);
  useEffect(() => {
    if (!ref.current) return;
    const el = ref.current;
    // Find the .lx-reveal element (might be el itself or a descendant)
    const target = el.classList.contains("lx-reveal") ? el : el.querySelector(".lx-reveal");
    if (!target) return;
    target.classList.add("is-pending");
    const fallback = setTimeout(() => target.classList.remove("is-pending"), 500);
    const io = new IntersectionObserver(
      (entries) => entries.forEach((e) => {
        if (e.isIntersecting) { target.classList.remove("is-pending"); clearTimeout(fallback); io.disconnect(); }
      }),
      { threshold: 0, rootMargin: "0px 0px -80px 0px" }
    );
    io.observe(el);
    return () => { io.disconnect(); clearTimeout(fallback); };
  }, []);
  return ref;
}

Object.assign(window, { COPY, AppCtx, useApp, useReveal });
